From 710db5dbcdf10eb7ae449af8ef707f08ba77e89e Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?S=C3=A9bastien=20Helleu?= <flashcode@flashtux.org>
Date: Sat, 10 Feb 2018 08:23:47 +0100
Subject: logger: add option logger.file.fsync (closes #1145)

---
 doc/it/autogen/user/logger_options.adoc | 6 ++++++
 1 file changed, 6 insertions(+)

(limited to 'doc/it/autogen/user/logger_options.adoc')

diff --git a/doc/it/autogen/user/logger_options.adoc b/doc/it/autogen/user/logger_options.adoc
index 1c283250b..3519f52b6 100644
--- a/doc/it/autogen/user/logger_options.adoc
+++ b/doc/it/autogen/user/logger_options.adoc
@@ -26,6 +26,12 @@
 ** valori: 0 .. 3600
 ** valore predefinito: `+120+`
 
+* [[option_logger.file.fsync]] *logger.file.fsync*
+** descrizione: pass:none[use fsync to synchronize the log file with the storage device after the flush (see man fsync); this is slower but should prevent any data loss in case of power failure during the save of log file]
+** tipo: bool
+** valori: on, off
+** valore predefinito: `+off+`
+
 * [[option_logger.file.info_lines]] *logger.file.info_lines*
 ** descrizione: pass:none[scrive una riga informativa nel file di log quando il log inizia o termina per un buffer]
 ** tipo: bool
-- 
cgit v1.2.3

