From d0b11eceab406d347d1053472e00eba7b9c2b89f Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?S=C3=A9bastien=20Helleu?= <flashcode@flashtux.org>
Date: Thu, 20 Aug 2015 07:36:22 +0200
Subject: doc: remove blank lines at end of auto-generated files

---
 doc/en/autogen/user/logger_options.asciidoc | 1 -
 1 file changed, 1 deletion(-)

(limited to 'doc/en/autogen/user/logger_options.asciidoc')

diff --git a/doc/en/autogen/user/logger_options.asciidoc b/doc/en/autogen/user/logger_options.asciidoc
index 50a61eb34..7098934d0 100644
--- a/doc/en/autogen/user/logger_options.asciidoc
+++ b/doc/en/autogen/user/logger_options.asciidoc
@@ -66,4 +66,3 @@
 ** description: `maximum number of lines to display from log file when creating new buffer (0 = no backlog)`
 ** type: integer
 ** values: 0 .. 2147483647 (default value: `20`)
-
-- 
cgit v1.2.3

