From befa97ea81fd8257087758e1c777c0663757f6d1 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?S=C3=A9bastien=20Helleu?= <flashcode@flashtux.org>
Date: Sat, 10 Aug 2019 10:42:53 +0200
Subject: core: mention there's no fallback on the other Python version in
 release notes

---
 ReleaseNotes.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'ReleaseNotes.adoc')

diff --git a/ReleaseNotes.adoc b/ReleaseNotes.adoc
index 7be308183..afc42f534 100644
--- a/ReleaseNotes.adoc
+++ b/ReleaseNotes.adoc
@@ -23,12 +23,12 @@ https://weechat.org/files/changelog/ChangeLog-devel.html[ChangeLog]
 [[v2.6_python3_default]]
 === Python 3 by default
 
-Python 3 is now used by default to compile the "python" plugin (without fallback
+Python 3 is now used by default to compile the "python" plugin (no fallback
 on Python 2).
 
 The CMake option `ENABLE_PYTHON3` has been renamed to `ENABLE_PYTHON2`
 (configure option `--enable-python2`). If this option is enabled, the "python"
-plugin is built with Python 2 instead of Python 3.
+plugin is built with Python 2 (no fallback on Python 3).
 
 [[v2.5]]
 == Version 2.5 (2019-06-06)
-- 
cgit v1.2.3

