From f8116216110504bb5d85ca863189f68617f22188 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?S=C3=A9bastien=20Helleu?= <flashcode@flashtux.org>
Date: Sun, 18 Jun 2023 10:37:12 +0200
Subject: script: fix buffer used by command `/script list -i|-il|-o|-ol`

The command is now executed on the buffer where it is received instead of the
current buffer (in most cases this is the same buffer, but could be different
sometimes).
---
 ChangeLog.adoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'ChangeLog.adoc')

diff --git a/ChangeLog.adoc b/ChangeLog.adoc
index 41c7f6ba3..b2a33ffcc 100644
--- a/ChangeLog.adoc
+++ b/ChangeLog.adoc
@@ -29,6 +29,7 @@ Bug fixes::
   * core: fix cursor position after `/plugin list -i` or `/plugin list -il`
   * irc: fix display of country code in message 344 received as whois geo info (issue #1736)
   * script: fix cursor position after `/script list -i` or `/script list -il`
+  * script: fix buffer used by command `/script list -i|-il|-o|-ol`
 
 Tests::
 
-- 
cgit v1.2.3

