From 8c01e05da18b47a9667ea10802103f2197ec6b39 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?S=C3=A9bastien=20Helleu?= <flashcode@flashtux.org>
Date: Mon, 31 Jul 2017 07:36:41 +0200
Subject: core: add missing colon in ChangeLog

---
 ChangeLog.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'ChangeLog.adoc')

diff --git a/ChangeLog.adoc b/ChangeLog.adoc
index a74e0090e..2239b9e12 100644
--- a/ChangeLog.adoc
+++ b/ChangeLog.adoc
@@ -36,7 +36,7 @@ Bug fixes::
   * relay: fix send of "PART" command in backlog (irc protocol)
   * relay: fix parsing of CAP command without arguments in irc protocol, send ACK only if all capabilities received are OK and NAK otherwise (issue #1040)
 
-Tests:
+Tests::
 
   * display an error if the required locale en_US.UTF-8 is not installed
 
-- 
cgit v1.2.3

